From 7d69eceff82108ccc1e7d976912e5c34afeb259f Mon Sep 17 00:00:00 2001
From: Ulrich Müller <ulm@gentoo.org>
Date: Sat, 11 Apr 2015 23:25:58 +0200
Subject: Use the same line width for Emacs and Vim.

Lines seem to be wrapped at 100 characters throughout, with the
exception of eapi-cheatsheet.tex which is wrapped at 70 characters.
Assign the "fill-column" file local variable for Emacs accordingly.
---
 profiles.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'profiles.tex')

diff --git a/profiles.tex b/profiles.tex
index ca3b1d7..067a098 100644
--- a/profiles.tex
+++ b/profiles.tex
@@ -206,4 +206,5 @@ A package manager may treat \t{ARCH} values that are not the current architectur
 %%% LaTeX-indent-level: 4
 %%% LaTeX-item-indent: 0
 %%% TeX-brace-indent-level: 4
+%%% fill-column: 100
 %%% End:
-- 
cgit v1.2.3-65-gdbad

